hcs - CGRO-COMPTEL Observation Planning : SKY2-1/hcs sky.ps ( ), 13-FEB-96 / 14:10:04, P   1

COMPTEL / EGRET FOV FOV radius 25 deg

1.0 2.0

2.5

3.0

4.0

5.0

6.0

7.0 7.5 8.0

9.0

9.5

10.0

11.0

12.0

13.0

13.5

14.0

15.0

16.0

17.0

18.0

19.0

20.0

21.0

22.0

23.0

24.0

24.5

25.0

26.0

27.0

28.0 29.0

30.0

31.0

32.0

33.0

34.0

35.0

36.0

36.5

37.0

38.0

39.0

40.0

41.0

42.0

43.0

44.0

+30

0

-30

+60

-60

+90

-90 120 60 0 300 240

Galactic coordinate system AITOFF projection

COMPTON Gamma Ray Observatory

Phase I Sky Survey Completed 1992-11-17

PROGRAM SKY ; File name : ASS CGRO_COM (Plan # 39)