hcs - CGRO-COMPTEL Observation Planning : SKY2-1/hcs sky.ps ( ), 14-FEB-96 / 11:11:14, P   1

COMPTEL / EGRET FOV FOV radius 25 deg

201.0

202.0

203.0

203.3

203.6

204.0

205.0

206.0

207.0

208.0

209.0

210.0

211.0

212.0

213.0

214.0

215.0

216.0

217.0

218.0

219.4

220.0

221.0

222.0

223.0

224.0

226.0

227.0

228.0

230.0

230.5

231.0

229.0

229.5

301.0

232.0

232.5

+30

0

-30

+60

-60

+90

-90 120 60 0 300 240

Galactic coordinate system AITOFF projection

COMPTON G R O PHASE II

Final (actually observed) viewing plan as of 1993-09-07. COMPTEL predicted effective observing time; TDRS coverage 70% assumed.

PROGRAM SKY ; File name : PHASE_2 CGRO_COM version: 1993-09-09