hcs - CGRO-COMPTEL Observation Planning : SKY2-1/hcs sky.ps ( ), 11-NOV-97 / 11:09:09, P   1

min.: 0.00 d max.: 18.99 d

COMPTEL response zero at 50 deg radius

COMPTEL / EGRET FOV FOV radius 25 deg

601.1

520.9

602.0

603.0

605.1

604.1 606.0

607.0

608.0

609.0

610.0

610.5 611.1

612.1 624.1

614.5

616.1

617.1

617.3

617.5

617.7

617.8

618.0

619.0

619.2 619.4619.7

620.0

621.5

622.0

623.5

623.0

625.0

615.1

626.0

627.0

628.0

629.0

630.0

632.1

631.0

+30

0

-30

+60

-60

+90

-90 120 60 0 300 240

Galactic coordinate system AITOFF projection

0 5 10 15 20

Observation time in days

COMPTON G R O - Phase IV - Cycle 6

Final Viewing Plan 1997-11-11 COMPTEL predicted eff. observing time; TDRS coverage included.

PROGRAM SKY ; File name : c6-final.cgro_com version: 1997-11-11 (=plan # 615)